EPM TRANSP

Experiment

4.05.00.51.01.5

Energy (MJ)

Time (sec)

Figure 9. Comparison of the measured and TRANSPcomputed stored energy for the conditions of figure 5. The stored energy falls below that computed when the EPM sbegin, indicating that they are primarily responsible for the losses of the fast ions.