0100200300400500

B

B

A

A

A

A

A

A

A

B

A

A

A

A190200210220190200210220190200210220

Frequency (kHz)

Time (msec)

4.0 MW

4.4 MW

5.2 MW

Figure 6. Mirnov loop frequency spectra for three conditions with increasing rf power.

Note that the duration of the activity of the EPM s before the giant sawtooth is practically independent of rf power. The s, in all cases, appear before the onset of TAE s.