19020021022001.01.20.91.113.53.63.73.83.94.04.1

Frequency (kHz) lost ions stored energy a.u.MJTime (sec)

Figure 5. Correlation between EPM excitation, lost ions and stored energy: losses increase and stored energy saturates at the onset of theEPM s. Conditions as in figure 1, P rf = 6.3 MW