5.02.02.53.03.54.04.50.00.51.01.52.02.5

Time (s) IBW BIBW A

(a)

SDT

(1016s-1)

2702802903003103203303403503600.00.51.01.52.0

IBW AIBW B R (cm)

5WT3WD n

T (1012 cm

-3)

(b)TOPFig.4, LeBlanc et al., Phys. Rev. Lett.