5 . 0 0

0 . 0 0 3 3 - 0 51 01 52 02 53 02 8 0 08 0 01 0 0 01 2 0 01 4 0 01 6 0 01 8 0 02 0 0 02 2 0 02 4 0 0

1 5 2 0 2 5 3 0 2 8 0 0

8 0 0

1 0 0 0

1 2 0 0

1 4 0 0

1 6 0 0

1 8 0 0

2 0 0 0

2 2 0 0

2 4 0 0

2 6 0 0

Shot Before InjectionInjectionTime (4 ms/div.)