0 . 0

0 . 5

1 . 0

4 . 0

- 2 . 0

2 . 0

0 . 8

- 1 . 0

0 . 3

0 . 1

0 . 2

3 . 0

2500

IpBolBIIINeOVISXR Z=0 (C V + B IV)(b) With B injectionTime (4 ms/div.)

1 . 5

0 . 0

0 . 5

1 . 0

4 . 0

- 2 . 0

2 . 0

- 0 . 5

- 2 . 5

- 1 . 5

- 1 . 0

5001000150020002500Time (4 ms/div.)IpBolB III NeO VISXR Z=0 (C V + B IV)(a) Without injection