Gas Input From PiezoelectricPulsed ValveBoronTrajectory

PropellantTube

Viewport

MicropelletLoad

Rotary Motion

CDX-ULinearMotion16 BarrelTurret

Barrel

Gate Valve

10 cmFig. 1