n [1014 cm-3]

r [cm]

1502002503003500.00.51.0rcro

e

10-310-210-10-310-210-1n kx [cm

-1]-50510-310-210-1-4-3-2-1234(c)(b)(a)

|An |

01201212x [cm]

(c)(b)(a)-75075

|E |b|E |b|E |b

0(b)10-100(a)2-2x [cm]

075-75(c)20-20

~

f [rad]

~ ~

r [cm]

0.00.30.6150200250300350abc

sE

rcrorGFig. 5

x [cm]

012(a)012(b)0(c)75-7521

|E |b|E |b|E |b

02-2(a)-40(b)4075-75x [cm]

(c)10-100

~

f [rad]

~ ~

10-100

~

f [rad]

050-50x [cm]

050-50012

|E |b

< An > |

n kx [cm

-1]-505-4-3-2-123410-110-210-310-110-210-31(a)(b)

|

0.01.53.00.01.53.00.00.751.500.00.751.50r(a)(b)

F (r)F (r)

RiceRayleigh

10-310-210-110-310-210-11r=r

Gr=ro0.11.0n kx [cm -1]

GfGf

0.03.09.012.015.0-100-500x [cm]

50100

Df [rad]

6.0

0.05.010.015.0-100-50050100

Df [rad]

-5.00.05.010.015.0

-5.0-40-2002040x [cm]

-100-50050100

Df [rad]

0.05.0

-40-2002040x [cm]

1.02.03.04.00.05.01.02.03.04.0