d

B

( ga u ss

)20-2

20-23.1313.1343.1323.133time(sec) (a) x r

.

e xp

( c m) ma x

( kH z) w

2 p q100-1020

W0246(b) (d) xr from Mirnov (7 kHz)

7 kHz22 kHz ( x 4)

(c)Observed MHD mode frequency 4.0

( cm

) x r

.

ex p

( r

)2.00.0

major radius (m)

3.03.43.13.23.33.5#91254