326.0

320.6

314.7

308.6

302.5

295.9

290.5

284.5

279.0

273.6

268.1

R(cm) t=3.85 s t=4.0 s t=4.75 s

0.3 ms

(a)(b)Z. Chang Fig.5 time (sec)

79017

W (cm)

0.5 ms t=4.90 s ch13 ch12 ch11 ch10

4.04.5.0510m/n=3/2 magnetic calculation

ECE measurement