pitch angle (deg)

4050607080510

01020300

-30-20-1001020300

-30-20-1004050607080510 g yr o r a d iu s ( cm

)pixel #line # g yr o r a d iu s ( cm

)pitch angle (deg)pixel #line #Aperture location rap = +1.0 cm (#87475) Aperture location rap = - 2.0 cm (#87474) alphasignal background

Figure 10alphasignal