6.4 cmmidplane probe body probeapertures probe tip probeapertures incomingalpha orbitalpha impacts scintilla t or scintillator scint i lla t or (2.5 cm x 2.5 cm)pinholeslit

45…fiberbundle out l ine scint i llator ou t line pixelline2 cm5101520255102025pinholeslit15

A�¤alpha signal

Figure 4

3 cm