VG100895aFigure 113.95153.9513.9523.95253.9533.95353.954Time (sec)

R=194R=208R=247R=268R=300R=316#76778

NEU

TRO

N

CO

UNT

S

(

1.

E

1

6n

/ m

2 se c)2.01.0642302010201064232121R=223 cm0IPhase IIIII