Time(sec)

3.94903.94953.95003.95053.9510

76778050796 sib

G

PC

2

( a

.u

) d

B p

(t)/d t

G

PC

1

( a

.

u

)

( a

.u

)Q=247.5

‘Figure 9mode coupling m=4/n=1Externa MHDR=294 cmR=300 cmn=1n=3 3.9511Change in internal mode