R

( m)

D

T e

( a

.

u

)3015-150

d

B

/ d t

(

T e sl a

/se c

)76778051396 SIB(a)Figure 8aQ=153

3.94903.94953.95003.95053.9510Time(sec)a

1969016212610266154

19224624411644722.32.42.52.52.62.72.82..82.93.03.03.13.23.27407951740740758axisGPC1 r/a=0r/a=0.5