sec)R=244 cm

R=244 cm

R=285 cm

R=285 cm (invert.)

m=1m=0

#76773 SIB 030895bFigure 7

244.5725.38251.5419.14259.3435.27266.01122.17272.71897.44280.42079.55285.61842.87292.02346.53299.8841.50

R(cm)DTe

baGPC2 c