t=3.922 secabt=3.922442 sect=3.922370 sec

2503003500 t=3.922590 secMajor radius (cm)

T e

( ke

V

)50100000555551010101010250300250250250250300300300300350350350350350cdeft=3.922288 sect=3.922342 secStartBallooning modefast m=1/n=176773 SIBNon thermal ECEGPC1Relax stage

ECE2 in islands

Figure 6b(b)76773 GPC2GPC2GPC2GPC1GPC1GPC1GPC1GPC2GPC2GPC2Slow m=1/n=1m=1/n=1m=1/n=1Formation of global islands n=3Quasistationary n=3axis