t=3.951286 sect=3.951532t=3.951572t=3.951586t=3.951602 f1=3.951884f2=3.952312f3=3.952590GPC1GPC2 (nonthermal)

Te

( k e

V

)Major radius (cm)2503003003003003003002502502502502505555551010101010101515 t=3.951884-3.952312 sec

76778 SIB bacdefStartm=1/n=1Ballooning modeFast m=1/n=1Island formation beginsm=3/n=2Quasistationary n=3Nonthermal ECE in islandsLocked modeGPC2 (nonthermal)

Major thermal quenchFigure 6am=2/n=1 n

=

3GPC1GPC1GPC1GPC1GPC1GPC2GPC2GPC2#76778 (a) n

=

3m=3/n=1Slow m=1/n=1m=1/n=1

B a l lo o ni n g m o d eFormation of global islandsaxis