IbTFTR #76773SIB 280795bFigure 3b

R=294 cm

R=247 cm

R=268 cm

R=275 cm

3.92253.9220

3.9230Time (seconds)

IaIc0

T e

( ke

V

)

(

A

.U

.)

a

- l o sse s N e u tr o n s

1

.

E

1

6 n

/ m

2 se cIa.Rapid m=4/n=1Ic.Reconstruction and relaxIb."Explosion"Q=153Q=270

even mode (m=0?)minor thermal quench,Odd mode (m=1?)"Ballooning" modeNonthermal electrons

(b)5-20

(V

) d

B p

/d t0abdcefm=2 3

23253638.8

EC

E810.5 67