300100200400R (cm)121514131211109876543ECEQ=90Q=27000Q=00Neutron collimator

R

=

24

7

R

=

2

0

8

R

=

2

6

8a-losses

TFTRSIB 030895aMirnov coils

R

=

31

6Figure 1b

R

=

1

9

4

R

=

2

23

R

=

3

3

2

R

=

3

0

0Q=180(b)