Q/bn_abs_n1_q28_a02

2.00.0|dBn|(arb)

Passive / active shell covers major poloidal domain excited by resistive wall modepassive shellactive coils

0 normalized poloidal distance from the mid plane-0.5 +0.50.+0.5-0.5 normal dB to the shell predicted by the external kink modeFig. 3