-1.0 mtoroidal 360 degrees p ol oi d al c ove ra gen = 2

1.0 m n = 1

Fig. 2 The actual coil location shown in comparison with the eddy current pattern for n = 1 and n =2. The solid line represents the toroidal location of the maximum and minimum eddy current in the poloidal components, which is discussed in Sec. 4.3.1