external mode structure mirnov shell eddy current helical flux leakage sensorinternal mode structure soft xray ECEresistive wall modes - toroidal n-values - toroidal phasen=0 vertical position mode internal kink mode resistive tearing mode equilibrium parameters locked modesSchematic of Mode Identification Processconsistency withinternal mode profile other eddy contributions fig-4.2.1/v01Fig. 1